decay length (m) -1 10 1 y/d Nd

-4 10 -3 10 -2 10 -1 10 nΛ

ALICE Upper limits (99% CL, 0-10% central) Pb-Pb = 2.76 TeV

NNs Thermal model prediction (156 MeV) Λ Decay length of free

Decay length (m)

-210

×2^{-1}10^{-1}10×2 1 2 3 y/d Nd

-410

-310

-210 ΛΛ